CREATE TABLE IF NOT EXISTS ohm_stats (
   time TIMESTAMPTZ NOT NULL,
   host TEXT,
   hardware TEXT,
   hardware_type TEXT,
   identifier TEXT,
   sensor TEXT,
   sensor_type TEXT,
   sensor_index INT,
   value REAL
);

SELECT create_hypertable('ohm_stats', 'time', if_not_exists => TRUE);
CREATE INDEX IF NOT EXISTS idx_ohm_host ON ohm_stats (host);
CREATE INDEX IF NOT EXISTS idx_ohm_identifier ON ohm_stats (identifier);
